 C86Net Shared Rooms
 -------------------
   ^variantname can network (also known as 'Share') designated rooms.
Shared rooms can be identified by their room prompts, which differ from
the normal room prompts ('>', ']'); networked room prompts are ')' for normal
network rooms, and ':' for directory network rooms.

   Network rooms carry both normal messages and network messages.  Normal
messages are entered as they are in any other room, and will remain on the
system that they were entered on.  Net messages, on the other hand, are not
only present on the current system, but also are sent during networking to
other systems that are participating in the networking effort for this room.
The basic format for entering a NETWORK MESSAGE is

 .<E>nter <N>etwork-Message

  Then you are allowed to enter your message (supposing that you have network
privileges). The message header will have attached to it "@<this system name>"
to let you and everyone else know that this is a net-message.

   There is a Read option connected with the Network, the Local-only option.

      .<R>ead <L>ocal ...

   causes the system to display only those messages which originated on
^nodetitle.  See .Help READ for a little more detail on the .Read command.


 %ADVANCED Back to the advanced commands help menu.
 %HELPOPT Get a list of all help files in the system.
 %MAINHELP First level of help system.

